autogen definitions command_test.tpl;

int_type = { 
	list_element	= char ;
	data_type		= short ;
	function		= CHAR_SHORT ;
	item_count		= "126" ;
	};

int_type = { 
	list_element	= short ;
	data_type		= short ;
	function		= SHORT_FUNC ;
	item_count		= "BUFFER_SIZE / sizeof (short)" ;
	};

int_type = { 
	list_element	= "24bit" ;
	data_type		= int ;
	function		= TRIBYTE_FUNC ;
	item_count		= "BUFFER_SIZE / sizeof (int)" ;
	};

int_type = { 
	list_element 	= int ;
	data_type		= int ;
	function		= INT_FUNC ;
	item_count		= "BUFFER_SIZE / sizeof (int)" ;
	};
			

float_type = { 
	list_element = float ;
	};

float_type = { 
	list_element = double ;
	};


